[[control]]
== Control interface

The actual protocol is described in <<common-control-if>>, the variables
common to all programs using it are described in <<ctrl_common_vars>>. Here we
describe variables specific to OsmoTRX.

.Variables available over control interface
[options="header",width="100%",cols="20%,5%,5%,50%,20%"]
|===
|Name|Access|Trap|Value|Comment
|===
