:gfdl-enabled:

OsmoSGSN User Manual
====================
Harald Welte <hwelte@sysmocom.de>


include::../common/chapters/preface.adoc[]

include::chapters/overview.adoc[]

include::chapters/running.adoc[]

include::chapters/control.adoc[]

include::../common/chapters/vty.adoc[]

include::../common/chapters/logging.adoc[]

include::chapters/configuration.adoc[]

include::../common/chapters/gb.adoc[]

include::../common/chapters/control_if.adoc[]

include::../common/chapters/oap.adoc[]

include::chapters/gsup.adoc[]

include::../common/chapters/port_numbers.adoc[]

include::../common/chapters/bibliography.adoc[]

include::../common/chapters/glossary.adoc[]

include::../common/chapters/gfdl.adoc[]
