diff --git a/doc/manuals/chapters/remsim-bankd.adoc b/doc/manuals/chapters/remsim-bankd.adoc
index 87dafa1..ab7a362 100644
--- a/doc/manuals/chapters/remsim-bankd.adoc
+++ b/doc/manuals/chapters/remsim-bankd.adoc
@@ -108,6 +108,7 @@
 
 This CSV file specifies the mapping between the string names of the PCSC
 readers and the RSPRO bandk/slot numbers.  The format is as follows:
+
 * first column: bankd number
 * second column: slot number within bankd
 * third column: extended POSIX regular expression matching the slot
