diff --git a/doc/manuals/chapters/running.adoc b/doc/manuals/chapters/running.adoc
index 5f24746..d20c907 100644
--- a/doc/manuals/chapters/running.adoc
+++ b/doc/manuals/chapters/running.adoc
@@ -5,24 +5,27 @@
 
 === SYNOPSIS
 
-*osmo-hlr* [-h|-V] [-d 'DBGMASK'] [-D] [-c 'CONFIGFILE'] [-s] [-T] [-e 'LOGLEVEL'] [-l 'DATABASE']
+*osmo-hlr* [-h] [-c 'CONFIGFILE'] [-l 'DATABASE'] [-d 'DBGMASK'] [-D] [-s] [-T] [-e 'LOGLEVEL'] [-V]
 
 === OPTIONS
 
+// Keep the order the same as in osmo-hlr --help!
+
 *-h, --help*::
 	Print a short help message about the supported options
-*-V, --version*::
-	Print the compile-time version number of the OsmoBTS program
+*-c, --config-file 'CONFIGFILE'*::
+	Specify the file and path name of the configuration file to be
+	used. If none is specified, use `osmo-hlr.cfg` in the current
+	working directory.
+*-l, --database 'DATABASE'*::
+	Specify the file name of the SQLite3 database to use as HLR/AUC
+	storage
 *-d, --debug 'DBGMASK','DBGLEVELS'*::
 	Set the log subsystems and levels for logging to stderr. This
 	has mostly been superseded by VTY-based logging configuration,
 	see <<logging>> for further information.
 *-D, --daemonize*::
 	Fork the process as a daemon into background.
-*-c, --config-file 'CONFIGFILE'*::
-	Specify the file and path name of the configuration file to be
-	used. If none is specified, use `osmo-hlr.cfg` in the current
-	working directory.
 *-s, --disable-color*::
 	Disable colors for logging to stderr. This has mostly been
 	deprecated by VTY based logging configuration, see <<logging>>
@@ -35,9 +38,8 @@
 	Set the global log level for logging to stderr. This has mostly
 	been deprecated by VTY based logging configuration, see
 	<<logging>> for more information.
-*-l, --database 'DATABASE'*::
-	Specify the file name of the SQLite3 database to use as HLR/AUC
-	storage
+*-V, --version*::
+	Print the compile-time version number of the OsmoBTS program
 
 === Bootstrap the Database
 
