diff --git a/doc/manuals/chapters/running.adoc b/doc/manuals/chapters/running.adoc
index d20c907..ad89974 100644
--- a/doc/manuals/chapters/running.adoc
+++ b/doc/manuals/chapters/running.adoc
@@ -39,7 +39,7 @@
 	been deprecated by VTY based logging configuration, see
 	<<logging>> for more information.
 *-V, --version*::
-	Print the compile-time version number of the OsmoBTS program
+	Print the compile-time version number of the OsmoHLR program
 
 === Bootstrap the Database
 
