Osmo-GSM-Tester Manual
======================
Neels Hofmeyr <nhofmeyr@sysmocom.de>

== WARNING: Work in Progress

*NOTE: The osmo-gsm-tester is still in pre-alpha stage: some parts are still
incomplete, and details will still change and move around.*

include::chapters/intro.adoc[]

include::chapters/install.adoc[]

include::chapters/config.adoc[]

include::chapters/trial.adoc[]

include::chapters/test_api.adoc[]

include::chapters/debugging.adoc[]
